USE [We_AppDb_V2.2_Dev]; 

INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011001', N'大面积停电提示', N'【1-1.风险监测信息报送】常态化值班员：报告主任，收到国网公司发布的强对流天气橙色预警，7月15日，中央气象台发布强对流天气橙色预警，未来三天，我国华东大部地区有大风、雷暴天气，局部地区阵风可达12级以上。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011002', N'大面积停电提示', N'【1-2.分析研判与预警发布】大面积停电应急办：(1)报告领导，收到国网公司发布的强对流天气橙色预警，7月15日，中央气象台发布强对流天气橙色预警，未来三天，我国华东大部地区有大风、雷暴天气，局部地区阵风可达12级以上。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011003', N'大面积停电提示', N'【1-2.分析研判与预警发布】分部领导：收到，请各相关部门按国网公司预警通知内容要求落实相关措施。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011004', N'大面积停电提示', N'【1-2.分析研判与预警发布】大面积停电应急办：(2)立即召集生技部、调控中心等部门（中心）开展会商研判。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011005', N'大面积停电提示', N'【1-2.分析研判与预警发布】大面积停电应急办主任：同志们，现在召开预警会商会，请生技部、调控中心等部门汇报本专业目前情况及对强对流天气影响的分析研判。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011006', N'大面积停电提示', N'【1-2.分析研判与预警发布】生技部：此次强对流预计会对华东区域电网设备造成较大影响，可能导致大量输配电线路发生异物挂线、倒塔断线，低洼站房可能发生雨水倒灌等事件，建议分部发布大面积停电黄色预警，生技部将立即组织相关单位落实防风防汛等措施。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011007', N'大面积停电提示', N'【1-2.分析研判与预警发布】调控中心：目前华东区域调度用电负荷36470万千瓦，电网运行平稳，关键断面潮流可控，电力供需紧平衡。此次强对流可能严重影响华东区域电网正常运行，极端情况下甚至可能出现局部大面积停电，建议发布大面积停电事件黄色预警。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011008', N'大面积停电提示', N'【1-2.分析研判与预警发布】大面积停电应急办：(3)起草大面积停电黄色预警通知，报大面积停电应急领导小组审批。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011009', N'大面积停电提示', N'【1-2.分析研判与预警发布】大面积停电应急领导小组：同意发布华东分部大面积停电事件黄色预警，立即组织安全应急办成员部门开展预警值班，请各相关单位立即按照预案要求开展预警行动，严格落实各项预警措施，并及时向总部及政府相关部门汇报预警响应情况。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011010', N'大面积停电提示', N'【1-3.预警响应（预警行动）】调控中心：根据当前电网运行情况，立刻调整停电计划，通知省市公司优化运行方式，做好电力电量平衡，加强重要设备、关键断面潮流监控，做好重点分区发用电平衡及枢纽厂站全停事故预案，确保电网安全稳定运行和电力可靠供应。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011011', N'大面积停电提示', N'【1-3.预警响应（预警行动）】大面积停电应急办：密切关注事态发展，收集相关信息，加强值班值守，请各省市公司核查现场人员、队伍、装备、物资“四要素”资源预置，做好后勤、通信保障，防范或减轻突发事件造成的损失。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011012', N'大面积停电提示', N'【1-3.预警响应（预警行动）】生技部：请各省市公司加强设备巡视检查和运行监测，采取有效措施控制事态发展，做好应急所需物资、装备和设备等应急保障准备工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011013', N'大面积停电提示', N'【1-4.先期处置】调控中心：已协助省市调度，隔离故障设备，控制停电范围；紧急调整全网机组出力，抬高直流落点近区电压水平，全力调整系统频率、电压、潮流到限额以内；启动华东电网直流失去省市共担互保机制，加强省间电力互济，保障全网和各省市电力平衡；通知相关现场，立即组织开展故障设备抢修工作。已向国调中心汇报事件情况，并申请跨区直流功率短时不回降，尽可能增加跨区送电水平，支援华东电网故障处置。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011014', N'大面积停电提示', N'【1-4.先期处置】生技部：已督促受灾单位开展现场勘察、收集灾损信息，并督促省市公司做好抢修工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011015', N'大面积停电提示', N'【1-4.先期处置】大面积停电应急办：第一时间向国网公司总部、华东能监办汇报了电网受灾和抢修情况。已要求各单位与政府部门协同联动，加强抢修现场安全管控，严防人身伤害事件。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011016', N'大面积停电提示', N'【1-4.先期处置】相关事发单位：上海、江苏、安徽、浙江、福建公司已启动省内大面积停电事件III级应急响应，按华东网调要求落实电力互济措施，通知省内应急基干队伍集结待命，全面开展用户复电和抢修工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011017', N'大面积停电提示', N'【1-5.响应启动-分析研判及响应启动】大面积停电应急办主任：报告领导，目前华东区电网受本次强对流天气影响严重，安徽池州-九华输电通道中的±800千伏复奉、灵绍、锦苏等3回跨区直流线路相继发生双极闭锁，江苏句容电厂送出输电通道故障，苏北风电大面积脱网，全网减供负荷3433万千瓦，占故障前电网负荷的9.41%，区域内各省市公司已启动大面积停电事件Ⅲ级应急响应，建议启动分部大面积停电事件Ⅲ级应急响应。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011018', N'大面积停电提示', N'【1-5.响应启动-分析研判及响应启动】分部领导：收到，同意启动分部大面积停电事件Ⅲ级应急响应。请各相关部门按分部大面积停电应急预案要求落实相关措施。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011019', N'大面积停电提示', N'【1-6.响应启动-视频会商】指挥长：同志们，本次强对流天气对华东地区电网影响严重，下面我们召开应急会商会，请生技部、党建部、调控中心等部门汇报具体受灾及处置情况。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011020', N'大面积停电提示', N'【1-6.响应启动-视频会商】调控中心：(1)7月16日10:35，安徽池州-九华、江苏句容电厂送出输电通道所在区域突发强对流天气。受灾害性天气影响，句容电厂送出通道线路故障跳闸，造成电厂400万千瓦出力损失，同时，苏北地区部分风电机组受大风影响脱网，损失出力800万千瓦，导致系统频率跌落至49.60赫兹。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011021', N'大面积停电提示', N'【1-6.响应启动-视频会商】调控中心：(2)随后，安徽池州-九华输电通道中的±800千伏复奉、灵绍、锦苏等3回跨区直流线路相继发生双极闭锁，损失功率1937万千瓦。受此影响，华东电网频率最低跌至48.74赫兹，导致低频减载装置动作，全网减供负荷3433万千瓦，占故障前电网负荷的9.41%，其中上海损失负荷323万千瓦、江苏1207万千瓦、浙江952万千瓦、安徽518万千瓦、福建433万千瓦。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011022', N'大面积停电提示', N'【1-6.响应启动-视频会商】调控中心：(3)调控中心已经协助省市调度，隔离故障设备，控制停电范围；紧急调整全网机组出力，抬高直流落点近区电压水平，全力调整系统频率、电压、潮流到限额以内；启动华东电网直流失去省市共担互保机制，加强省间电力互济，保障全网和各省市电力平衡；通知相关现场，立即组织开展故障设备抢修工作。向国调中心申请跨区直流功率短时不回降，并尽可能增加跨区送电水平，支援华东电网故障处置。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011023', N'大面积停电提示', N'【1-6.响应启动-视频会商】生技部：目前安徽池州-九华、江苏句容电厂送出输电通道所在区域仍处于强对流天气影响下，督促江苏、安徽公司做好抢修准备工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011024', N'大面积停电提示', N'【1-6.响应启动-视频会商】党建部：目前自媒体、地方已有受灾停电信息，尚未出现大范围舆情。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011025', N'大面积停电提示', N'【1-6.响应启动-视频会商】安监部：已开展灾损统计和信息报送工作，向总部及华东能监局汇报了电网受灾和抢修情况，已要求各单位与政府部门协同联动，加强抢修现场安全管控，严防人身伤害事件。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011026', N'大面积停电提示', N'【1-6.响应启动-视频会商】相关事发单位：(1)上海公司已启动Ⅲ级应急响应，电网运行总体平稳，正抓紧开展复电抢修工作，未发生次生衍生灾害事件，但电力供应源存在250万千瓦供应缺口，请华东分部给与市外来电支援。江苏公司已启动省内大面积停电事件Ⅲ级应急响应，应急基干分队已投入现场灾情勘查，正在开展用户复电、句容电厂送出通道故障抢修、苏北风机并网等工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011027', N'大面积停电提示', N'【1-6.响应启动-视频会商】相关事发单位：(2)浙江公司已启动省内大面积停电事件Ⅲ级应急响应，正在开展用户复电工作。安徽公司已启动省内大面积停电事件Ⅲ级应急响应，应急基干分队已投入现场灾情勘查，抢修人员均已到岗到位，抓紧开展用户复电、池州—九华通道受损线路抢修工作。福建公司已启动省内大面积停电事件Ⅲ级应急响应，正在开展用户复电工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011028', N'大面积停电提示', N'【1-7.响应行动-响应措施】电网调控组（调控中心）：我是华东网调XXX，向国调中心申请跨区直流增送400万千瓦，支援华东电网故障处置。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011029', N'大面积停电提示', N'【1-7.响应行动-响应措施】生产技术组（生技部）：已督促江苏、安徽公司全力做好电网恢复应急抢修工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011030', N'大面积停电提示', N'【1-7.响应行动-响应措施】舆情处置组（党建部）：【新闻内容】受灾害性天气影响，华东区域发生电网大面积停电，影响部分用户电力正常供应。国网华东分部和国网上海、江苏、浙江、安徽、福建电力已按照应急预案启动Ⅲ级应急响应，目前正积极开展快速恢复供电和故障设备抢修工作。请大家保持冷静，积极配合维护社会稳定。我们将会及时发布关于事态的进一步消息。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011031', N'大面积停电提示', N'【1-8.响应终止-结束会商】指挥长：(1)同志们，现在召开应急响应结束会商会议，下面请各单位、各部门汇报情况。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011032', N'大面积停电提示', N'【1-8.响应终止-结束会商】相关事发单位：(1)上海公司：目前上海电网运行平稳，停电负荷已全部恢复，已结束大面积停电III级应急响应。江苏公司：目前江苏电网停电负荷已恢复，句容电厂送出通道和苏北风电机组已恢复正常运行，已结束大面积停电Ⅲ级应急响应。浙江公司：目前全网停电负荷已全部恢复，已结束大面积停电Ⅲ级应急响应。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011033', N'大面积停电提示', N'【1-8.响应终止-结束会商】相关事发单位：(2)安徽公司：目前安徽电网停电负荷已恢复，已结束大面积停电事件Ⅲ级应急响应，后续将继续做好受损线路的抢修工作。福建公司：目前福建电网负荷已全部恢复，已结束大面积停电事件Ⅲ级应急响应。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011034', N'大面积停电提示', N'【1-8.响应终止-结束会商】电网调控组（调控中心）：目前江苏句容电厂送出通道、安徽池州-九华输电通道内的复奉、灵绍直流线路已抢修完毕、恢复运行，锦苏直流线路预计未来三天内可以恢复送电。华东主网已经恢复正常接线方式，全网频率、电压和潮流持续控制在限额以内，主要发电机组运行稳定，前期故障引发的减供负荷已经全部恢复。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011035', N'大面积停电提示', N'【1-8.响应终止-结束会商】生产技术组（生技部）：华东区域内强对流灾害天气基本结束。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011036', N'大面积停电提示', N'【1-8.响应终止-结束会商】舆情处置组（党建部）：本次大面积停电应急响应期间，未发生舆情事件。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011037', N'大面积停电提示', N'【1-8.响应终止-结束会商】综合协调组（安监部）：本次大面积停电应急响应期间，抢修现场未发生各类安全事件，没有发现造成重特大次生衍生事故的情况。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011038', N'大面积停电提示', N'【1-8.响应终止-结束会商】指挥长：(2)报告总指挥，抢修现场安全形势良好。目前华东区域电网已恢复正常运方，用电负荷已恢复99%以上，满足应急响应结束条件，建议分部结束大面积停电事件Ⅲ级应急响应。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011039', N'大面积停电提示', N'【1-8.响应终止-结束会商】总指挥：同意结束分部结束大面积停电事件Ⅲ级应急响应。请各单位、部门继续做好后续工作，并全面总结评估本次应急处置开展情况。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);



INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011040', N'人身伤亡事件提示', N'【2-1.先期处置及响应启动】现场人员：6月17日14时，在进行地下配电站10kV 1#进线柜柜顶小母线检修作业中，张三、李四两位同志触电，现场电源已切断，受伤人员已转移至安全地带，正在进行现场急救。目前已打120，正在等待救护车到达。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011041', N'人身伤亡事件提示', N'【2-1.先期处置及响应启动-1】华甸能源：(1)检修现场立即停工并保持现状，继续进行现场急救，派遣人员赶赴现场确认情况。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011042', N'人身伤亡事件提示', N'【2-1.先期处置及响应启动-1】华甸能源：(2)向分部人身伤亡应急办初报事件。（报告XX主任，6月17日14时，在进行地下配电站10kV 1#进线柜柜顶小母线检修作业中，张三、李四两位同志触电，现场已停工并封闭，受伤人员已转移至安全地带，正在进行现场急救。目前已打120，正在等待救护车到达，华甸能源已安排人员到现场组织开展应急处置。）', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011043', N'人身伤亡事件提示', N'【2-1.先期处置及响应启动-1】人身伤亡应急办主任：收到，请组织做好应急处置工作，密切关注伤员抢救进展情况，做好家属安抚，及时报送后续信息，我们将立即派人赶赴现场。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011044', N'人身伤亡事件提示', N'【2-1.先期处置及响应启动-1】华甸能源：(3)向分部总值班室初报事件。（报告XX主任，6月17日14时，在进行地下配电站10kV 1#进线柜柜顶小母线检修作业中，张三、李四两位同志触电，正在进行现场急救，等待救护车到达，华甸能源已安排人员到现场组织开展应急处置。）', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011045', N'人身伤亡事件提示', N'【2-1.先期处置及响应启动-1】总值班室主任：收到，请密切关注伤员抢救进展情况，及时报送后续信息。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011046', N'人身伤亡事件提示', N'【2-1.先期处置及响应启动-1】后勤中心：安排人员到现场组织开展应急处置。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011047', N'人身伤亡事件提示', N'【2-1.先期处置及响应启动-1】产业办：安排人员到现场协助开展应急处置。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011048', N'人身伤亡事件提示', N'【2-2.先期处置及响应启动-2】人身伤亡应急办：报告领导：6月17日14时，在进行地下配电站10kV 1#进线柜柜顶小母线检修作业中，张三、李四两位同志触电，经120救护人员初判，张三同志已无生命体征，李四同志伤情较重，但生命体征目前平稳。目前2人已由救护车转移至医院。建议启动分部人身伤亡事件四级应急响应。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011049', N'人身伤亡事件提示', N'【2-2.先期处置及响应启动-2】分部领导：收到，同意启动分部人身伤亡事件四级应急响应，请分部安全应急办和总值班室立即向国网公司总部安全应急办、总值班室以及华东能监局报告相关信息。督促华甸能源向上海市应急管理局报告相关信息。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011050', N'人身伤亡事件提示', N'【2-3.响应会商】副总指挥：（1）同志们，地下配电房检修作业过程中发生人员触电事件，下面我们召开应急会商会，请华甸能源汇报现场处置情况，各应急处置小组汇报先期处置情况。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011051', N'人身伤亡事件提示', N'【2-3.响应会商】华甸能源：6月17日14时，在进行地下配电站10kV 1#进线柜柜顶小母线检修作业中，张三、李四两位同志触电。目前2人已由救护车转移至医院，经医院确认张三同志已经死亡，李四同志伤势较重，但生命体征平稳，正在进行进一步抢救。已与伤亡人员家属取得联系，安抚家属情绪，现场已停工隔离。已向上海市应急管理局报告相关信息。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011052', N'人身伤亡事件提示', N'【2-3.响应会商】安监部：已向国网公司总部、华东能源监管局报送相关信息，上级单位要求全力做好伤员抢救和家属安抚工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011053', N'人身伤亡事件提示', N'【2-3.响应会商】后勤中心：已安排人员参与应急协调处置，督促做好伤员抢救和后勤保障工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011054', N'人身伤亡事件提示', N'【2-3.响应会商】产业办：已安排人员参与应急协调处置，督促做好应急处置工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011055', N'人身伤亡事件提示', N'【2-3.响应会商】党建部：已对地方媒体及自媒体平台加强关注，目前尚未发现相关舆情信息。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011056', N'人身伤亡事件提示', N'【2-3.响应会商】副总指挥：（2）好的，这次事件造成人员伤亡，万分痛心，各小组成员应密切关注事态发展，积极配合事件处置工作，及时将有关情况向华东能源监管局、上海市应急管理局和国网公司总部进行汇报。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011057', N'人身伤亡事件提示', N'【2-4.响应终止-结束会商】副总指挥：同志们，现再次召开应急会商会议，请各部门依次汇报响应处置情况。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011058', N'人身伤亡事件提示', N'【2-4.响应终止-结束会商】安监部：值班人员跟踪事件发展情况，收集事故抢险资料及信息，及时对政府相关部门及总部安全应急办进行汇报。已组织开展内部事故调查。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011059', N'人身伤亡事件提示', N'【2-4.响应终止-结束会商】后勤中心：已与医院做好对接，联系上海市外科专家赶赴医院参与救治指导，受伤人员第一时间得到妥善治疗。已指定专人协助开展内部事故调查。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011060', N'人身伤亡事件提示', N'【2-4.响应终止-结束会商】华甸能源：已指定专人现场面见家属，与家属保持沟通，目前家属情绪稳定。已落实李四同志医疗陪护工作，协助张三同志家属做好后事料理。指定专人配合开展内部事故调查。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011061', N'人身伤亡事件提示', N'【2-4.响应终止-结束会商】产业办：已安排人员参与应急协调处置，指定专人协助开展内部事故调查。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011062', N'人身伤亡事件提示', N'【2-4.响应终止-结束会商】党建部：持续开展舆情监测，目前尚未发现相关舆情信息。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011063', N'人身伤亡事件提示', N'【2-4.响应终止-结束会商】生技部：已安排专人联系相关专家，协助开展内部事故调查。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011064', N'人身伤亡事件提示', N'【2-4.响应终止-结束会商】指挥长：报告总指挥，目前伤亡人员抢救工作已结束，按照分部人身伤亡事件应急预案要求，建议解除分部人身伤亡事件Ⅳ级应急响应。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);
INSERT INTO [dbo].[Bs_StudentHelps] ([Id], [HelpName], [HelpContent], [IsDeleted], [DeleterUserId], [DeletionTime], [LastModificationTime], [LastModifierUserId], [CreationTime], [CreatorUserId]) VALUES (N'JY2012000011065', N'人身伤亡事件提示', N'【2-4.响应终止-结束会商】总指挥：好的，我宣布结束分部人身伤亡事件Ⅳ级应急响应，请安监部继续做好事故调查工作，华甸能源做好伤亡家属的安抚及伤员医护医疗。其余相关部门按照职责分工协助开展后续工作。', '0', NULL, NULL, NULL, NULL, '2024-06-24', 3);

